depth [m] cross track (north) a:shipboard; b,c:lowered

a

Fall96 0 100 200 300 400

b

0 100 200 300 400

154 155 156 157 158 159 160 161 162 163 164 165 166 167 168 169 170depth [m]

c

Celtic Shelf

-20 -18 -16

0 500 1000 1500 2000 2500 3000 3500 4000 4500

-20 -18 -16 -10 0 10 tide [cm s -1] longitude

-50 -40 -30 -20 -10 0 10 20 30 40 50 cm s -1

20.00°W, 51.50°N to 14.61°W, 51.50°N: 1996/11/28 to 1996/11/30